From 4d2b037dbe4e78aa90a4a6d9c7315dcf0a51fed9 Mon Sep 17 00:00:00 2001
From: Corentin Thomasset <corentin.thomasset74@gmail.com>
Date: Sat, 27 May 2023 17:36:15 +0200
Subject: refactor(ui): removed all n-space

---
 src/tools/http-status-codes/http-status-codes.vue | 6 ++----
 1 file changed, 2 insertions(+), 4 deletions(-)

(limited to 'src/tools/http-status-codes/http-status-codes.vue')

diff --git a/src/tools/http-status-codes/http-status-codes.vue b/src/tools/http-status-codes/http-status-codes.vue
index 992fbc1..9f827f5 100644
--- a/src/tools/http-status-codes/http-status-codes.vue
+++ b/src/tools/http-status-codes/http-status-codes.vue
@@ -21,10 +21,8 @@
       <n-h2> {{ category }} </n-h2>
 
       <c-card v-for="{ code, description, name, type } of codes" :key="code" mb-2>
-        <n-space align="center">
-          <n-text strong text-lg> {{ code }} {{ name }} </n-text>
-        </n-space>
-        <n-text depth="3">{{ description }} {{ type !== 'HTTP' ? `For ${type}.` : '' }}</n-text>
+        <n-text strong block text-lg> {{ code }} {{ name }} </n-text>
+        <n-text block depth="3">{{ description }} {{ type !== 'HTTP' ? `For ${type}.` : '' }}</n-text>
       </c-card>
     </div>
   </div>
-- 
cgit v1.2.3

