From 4d2b037dbe4e78aa90a4a6d9c7315dcf0a51fed9 Mon Sep 17 00:00:00 2001
From: Corentin Thomasset <corentin.thomasset74@gmail.com>
Date: Sat, 27 May 2023 17:36:15 +0200
Subject: refactor(ui): removed all n-space

---
 src/tools/json-diff/diff-viewer/diff-viewer.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/tools/json-diff/diff-viewer/diff-viewer.vue')

diff --git a/src/tools/json-diff/diff-viewer/diff-viewer.vue b/src/tools/json-diff/diff-viewer/diff-viewer.vue
index c77d407..8d17e6b 100644
--- a/src/tools/json-diff/diff-viewer/diff-viewer.vue
+++ b/src/tools/json-diff/diff-viewer/diff-viewer.vue
@@ -1,10 +1,10 @@
 <template>
   <div v-if="showResults">
-    <n-space justify="center">
+    <div flex justify-center>
       <n-form-item label="Only show differences" label-placement="left">
         <n-switch v-model:value="onlyShowDifferences" />
       </n-form-item>
-    </n-space>
+    </div>
 
     <c-card data-test-id="diff-result">
       <n-text v-if="jsonAreTheSame" depth="3" block text-center italic> The provided JSONs are the same </n-text>
-- 
cgit v1.2.3

