From 4d2b037dbe4e78aa90a4a6d9c7315dcf0a51fed9 Mon Sep 17 00:00:00 2001
From: Corentin Thomasset <corentin.thomasset74@gmail.com>
Date: Sat, 27 May 2023 17:36:15 +0200
Subject: refactor(ui): removed all n-space

---
 src/tools/json-viewer/json-viewer.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/tools/json-viewer/json-viewer.vue')

diff --git a/src/tools/json-viewer/json-viewer.vue b/src/tools/json-viewer/json-viewer.vue
index 60ae66c..7e95db1 100644
--- a/src/tools/json-viewer/json-viewer.vue
+++ b/src/tools/json-viewer/json-viewer.vue
@@ -1,13 +1,13 @@
 <template>
   <div style="flex: 0 0 100%">
-    <n-space style="margin: 0 auto; max-width: 600px" justify="center">
+    <div style="margin: 0 auto; max-width: 600px" flex justify-center gap-3>
       <n-form-item label="Sort keys :" label-placement="left" label-width="100">
         <n-switch v-model:value="sortKeys" />
       </n-form-item>
       <n-form-item label="Indent size :" label-placement="left" label-width="100" :show-feedback="false">
         <n-input-number v-model:value="indentSize" min="0" max="10" style="width: 100px" />
       </n-form-item>
-    </n-space>
+    </div>
   </div>
 
   <n-form-item
-- 
cgit v1.2.3

