From 05ea54547515f7fb1eed5f31ccbde10e36041fb1 Mon Sep 17 00:00:00 2001
From: Corentin THOMASSET <corentin.thomasset74@gmail.com>
Date: Sun, 25 Jun 2023 15:00:50 +0200
Subject: refactor(ui): replaced some n-input to c-input (#505)

---
 src/ui/c-input-text/c-input-text.demo.vue | 7 +++++--
 1 file changed, 5 insertions(+), 2 deletions(-)

(limited to 'src/ui/c-input-text/c-input-text.demo.vue')

diff --git a/src/ui/c-input-text/c-input-text.demo.vue b/src/ui/c-input-text/c-input-text.demo.vue
index b027787..0181e7c 100644
--- a/src/ui/c-input-text/c-input-text.demo.vue
+++ b/src/ui/c-input-text/c-input-text.demo.vue
@@ -66,11 +66,14 @@ const validation = useValidation({
     mb-2
   />
 
-  <c-input-text v-model:value="valueLong" multiline autosize mb-2 rows="5" />
-
   <c-input-text
     value="Lorem ipsum dolor sit amet consectetur adipisicing elit. Dolorum, est modi iusto repellendus fuga accusantium atque at magnam aliquam eum explicabo vero quia, nobis quasi quis! Earum amet quam a?"
     multiline
     clearable
   />
+
+  <h2>Autosize</h2>
+
+  <c-input-text v-model:value="value" label="Autosize" rows="1" multiline autosize mb-2 />
+  <c-input-text v-model:value="valueLong" label="Autosize monospace" rows="1" multiline autosize monospace mb-2 />
 </template>
-- 
cgit v1.2.3

